2.2 2.25 2.3 2.35

)^2c

) (GeV/ S 0 (pK M 50 100 150 200 250 300 350

2c Entries per 14.0 MeV/

2c 0.001 GeV/ ± = 2.289 μ , fixed to MC 2c = 0.014 GeV/ σ 28 ± ) = 119 σ3±S(

+ c.c. S 0 pK → ^+_cΛ c < 24 GeV/ Tp 12 <

= 5.02 TeV NNs Pb, − ALICE p

ALI-PUB-499698

ALI-PUB-499698